-- 小程序码维护功能，新增表字段，不影响原本的代码及功能
ALTER TABLE epdc_dept_ma_code ADD COLUMN `GRID` VARCHAR ( 128 ) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '网格名称';
ALTER TABLE epdc_dept_ma_code ADD COLUMN `PARENT_DEPT_IDS` VARCHAR ( 512 ) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '父所有部门';
ALTER TABLE epdc_dept_ma_code ADD COLUMN `PARENT_DEPT_NAMES` VARCHAR ( 512 ) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '父所有部门';
ALTER TABLE epdc_dept_ma_code ADD COLUMN `ALL_DEPT_IDS` VARCHAR ( 512 ) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所有部门ID';
ALTER TABLE epdc_dept_ma_code ADD COLUMN `ALL_DEPT_NAMES` VARCHAR ( 512 ) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所有部门名称';


