-------------------------------------------------------2019-11-14------------------------------------------------
-- 新增接口日志表
CREATE TABLE epdc_interface_log(
    ID VARCHAR(32) NOT NULL   COMMENT '主键' ,
    REFERENCE_ID VARCHAR(32) NOT NULL   COMMENT '引用ID' ,
    BUSINESS_TYPE VARCHAR(100)    COMMENT '业务类型' ,
    INTERFACE_NAME VARCHAR(200) NOT NULL   COMMENT '调用接口名称' ,
    SUCCESS_FLAG VARCHAR(1) NOT NULL   COMMENT '调用是否成功 0-调用失败，1-调用成功' ,
    CALL_MSG_BODY VARCHAR(2000)    COMMENT '调用消息体' ,
    RETURN_MSG_BODY TEXT    COMMENT '调用返回消息体' ,
    CREATED_BY VARCHAR(32) NOT NULL   COMMENT '创建人' ,
    CREATED_TIME DATETIME NOT NULL   COMMENT '创建时间' ,
    UPDATED_BY VARCHAR(32) NOT NULL   COMMENT '更新人' ,
    UPDATED_TIME DATETIME NOT NULL   COMMENT '更新时间' ,
    DEL_FLAG VARCHAR(1) NOT NULL   COMMENT '删除标记' ,
    PRIMARY KEY (ID)
) COMMENT = '接口日志表 接口日志表';;
-------------------------------------------------------2019-11-14------------------------------------------------